ICD-11 2025

Introduction

Codes

Codes List

ICD-11-MMS 2025
International Classification of Diseases
11th Revision

This digital edition provides the complete official code set for ICD-11 effective for the year 2025.

Codes

1A00: Cholera

1A00.0: Cholera due to Vibrio cholerae O1, biovar cholerae

5A11: Type 2 diabetes mellitus