ICD-10-CM 2025
The Complete Official Codebook

This digital edition provides the complete official code set for ICD-10-CM effective for the year 2025.

Codes

A00: Cholera

A00.0: Cholera due to Vibrio cholerae 01, biovar cholerae

A00.1: Cholera due to Vibrio cholerae 01, biovar eltor

A00.9: Cholera, unspecified

A01: Test Disease 1

A01.1: Test Disease 1 variant 1

A01.2: Test Disease 1 variant 2

A01.3: Test Disease 1 variant 3

A02: Test Disease 2

A02.1: Test Disease 2 variant 1

A02.2: Test Disease 2 variant 2

A02.3: Test Disease 2 variant 3

A03: Test Disease 3

A03.1: Test Disease 3 variant 1

A03.2: Test Disease 3 variant 2

A03.3: Test Disease 3 variant 3

A04: Test Disease 4

A04.1: Test Disease 4 variant 1

A04.2: Test Disease 4 variant 2

A04.3: Test Disease 4 variant 3

A05: Test Disease 5

A05.1: Test Disease 5 variant 1

A05.2: Test Disease 5 variant 2

A05.3: Test Disease 5 variant 3

A06: Test Disease 6

A06.1: Test Disease 6 variant 1

A06.2: Test Disease 6 variant 2

A06.3: Test Disease 6 variant 3

A07: Test Disease 7

A07.1: Test Disease 7 variant 1

A07.2: Test Disease 7 variant 2

A07.3: Test Disease 7 variant 3

A08: Test Disease 8

A08.1: Test Disease 8 variant 1

A08.2: Test Disease 8 variant 2

A08.3: Test Disease 8 variant 3

A09: Test Disease 9

A09.1: Test Disease 9 variant 1

A09.2: Test Disease 9 variant 2

A09.3: Test Disease 9 variant 3

E11.9: Type 2 diabetes mellitus without complications (Updated Guidance)